ALTER TABLE realmd_db_version CHANGE COLUMN required_6976_01_realmd_realmd_db_version required_7546_02_realmd_uptime bit;


--
-- Table structure for table `uptime`
--

DROP TABLE IF EXISTS `uptime`;
CREATE TABLE `uptime` (
  `realmid` int(11) unsigned NOT NULL,
  `starttime` bigint(20) unsigned NOT NULL default '0',
  `startstring` varchar(64) NOT NULL default '',
  `uptime` bigint(20) unsigned NOT NULL default '0',
  `maxplayers` smallint(5) unsigned NOT NULL default '0',
  PRIMARY KEY  (`realmid`,`starttime`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='Uptime system';
