ALTER TABLE character_db_version CHANGE COLUMN required_7324_02_characters_character_aura required_7544_02_characters_uptime bit;

--
-- Table structure for table `uptime`
--

DROP TABLE IF EXISTS `uptime`;
CREATE TABLE `uptime` (
  `starttime` bigint(20) unsigned NOT NULL default '0',
  `startstring` varchar(64) NOT NULL default '',
  `uptime` bigint(20) unsigned NOT NULL default '0',
  `maxplayers` smallint(5) unsigned NOT NULL default '0',
  PRIMARY KEY  (`starttime`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='Uptime system';
